<template>
  <SkeletonBlock 
    :width="size" 
    :height="size" 
    borderRadius="50%" 
    :margin="margin" 
  />
</template>

<script setup>
import SkeletonBlock from './SkeletonBlock.vue';

defineProps({
  size: { type: String, default: '48px' },
  margin: { type: String, default: '0' }
})
</script>
